array-info
array-info
check the status of a HP (Compaq) SmartArray controller
array-info -d array_device_path -a|-l|-A|-c|-s|-L|-h

DESCRIPTION
Array-info is a command line tool to retrieve informations and logical drives status from several RAID controllers (currently HP Compaq IDA and CISS and MD). It displays informations about the firmware version, Rom revision, number of physical and logical drives on the controller, aswell as the fault tolerance, size, number of physical disks and status for each logical drive.

OPTIONS

Generic options:
--device | -d 	 Path to array device, e.g. /dev/ida/c0d0 or /dev/cciss/c0d1
--all-drives | -a 	 Show informations about all drives
--logical drive | -l 	 Show informations about selected logical drive
--show-ctrl | -c 	 Show informations about controller
--show-logical | -L 	 Show informations about logical drives
--show-physical | -p 	 Show physical device informations
--show-status | -s 	 Show status of logical drives
--show-all | -A 	 Show all informations
--version | -V 	 Show version
-h 	 Show help about options

COPYRIGHT
This manual page was written by Raphaël Pinson <raphink@ubuntu.com>. Permission is granted to copy, distribute and/or modify this document under the terms of the GNU General Public License, Version 2 or any later version published by the Free Software Foundation.