		Call program by: clif <par1>. 
		When called without parameters standard input
		is opened otherwise <par1> file is opened as input.
		You can use upto 100 of <par1> files separated by <space>.
		Output is always standard output.
		To leave the environment type "exit;"
		For more details see user guide or ask authors
