\documentclass[a4paper,12pt]{scrartcl}
\usepackage[utf8]{inputenc}
%\usepackage{cmbright}
\usepackage[noheadfoot, left=1cm, right=1cm, top=4.93mm, bottom=4.93mm]{geometry}

\usepackage[newdimens]{labels}

\LabelInfotrue
\LabelGridtrue
\LabelRows=@@@_ROWS_@@@
\LabelCols=@@@_COLS_@@@
\LeftPageMargin=10mm
\RightPageMargin=10mm
\TopPageMargin=4.93mm
\BottomPageMargin=4.93mm
\InterLabelRow=2mm
\InterLabelColumn=2mm

\begin{document}

\begin{labels}
