
%Keys

 This dialog is divided  into two panels,  a top panel where
 you can  select and change  directories and a  bottom panel
 where  you can  select the current  directory.  Use TAB  to
 switch between these two panels. You can use the Arrow keys
 to move up/down in the top panel.  ENTER change directories
 in the  top panel and select  the current directory  in the
 bottom panel.  Apart from  these  there are  function  keys
 denoted  at the bottom  of the screen.  Pressing  them will
 bring up corresponding dialogs.

