cvslastchange
cvslastchange
Display the last change committed to CVS for a file
cvslastchange file

Description
cvslastchange displays the last change committed to CVS for a file. It uses cvs diff and cvs log to do this.
cvslastchange works on any CVS branch, not just HEAD.
This utility is part of the Software Development Kit.

See Also
cvslastlog(1) cvsrevertlast(1) cvs(1)