cvsrevertlast
cvsrevertlast
Revert files in CVS by one version
cvsrevertlast filename

Description
cvsrevertlast is used to revert all the files on the command line by one version in CVS. The files will not be committed.
This utility is part of the KDE Software Development Kit.

See Also
cvsblame(1)