Installation

How to obtain KMyApp

Requirements
In order to successfully use KMyApp, you need few libraries from 5.1 (bar, baz). Foobar.lib is required in order to support the advanced KMyApp features. KMyApp uses about 5 megs of memory to run, but this may vary depending on your platform and configuration.
All required libraries as well as KMyApp itself can be found on The KMyApp home page.
You can find a list of changes at https://apps.kde.org/kapp.

Compilation and Installation

Configuration
Don't forget to tell your system to start the dtd dicer-toaster daemon first, or KMyApp won't work!