Installation

How to Obtain LabPlot
LabPlot can be found on its homepage at sourceforge.net: http://labplot.sf.net. There is an overview about all available packages at http://labplot.wiki.sourceforge.net/Download. bug-fixed packages are released regular and can be found there too.

Requirements
In order to successfully use LabPlot, you need at least a standard 5 and KF5 installation, the scientific library (GSL), libcantor library.

Compilation and Installation