Command Line Options

Specify a File
When starting LabPlot from the command prompt, you can supply the name of a project file (ending with .lml, .lml.gz, .lml.bz2 or .lml.xz):
labplot2 file.lml

Other Command Line Options
The following command line help options are available
labplot2 --help 	This lists the most basic options available at the command line.
labplot2 --no-splash 	Do not show the splash screen
labplot2 --presenter 	Start in the presenter mode
labplot2 --author 	Lists LabPlot's author in the terminal window
labplot2 --version 	Lists version information for LabPlot. Also available through labplot2 -v