Command Reference

The File Menu
N File New 	Creates a new LabPlot project file.
In a project file all settings and all plots are stored in ASCII format.
O File Open 	Opens a LabPlot project file.
File Open Recent 	Opens a recent LabPlot project file.
Here the last used 10 project files are listed.
S File Save 	Saves the actual project.
If you haven't saved the project before the project is saved under a temporary project file name.
File Save As 	 Saves the actual project under a different name.
P File Print 	Prints the active plot.
Here a print dialog is opened where you can select the printer, different paper sizes,
File Print Preview 	Open a print preview window. LabPlot allows you to choose print settings using the toolbar of this window and view the result immediately.
= File New Spreadsheet 	Creates a new spreadsheet in the current folder of LabPlot project.
X File New Worksheet 	Creates a new worksheet in the current folder of LabPlot project.
File New Folder 	Creates a new spreadsheet in the current folder of LabPlot project.
File New File Data Source 	Opens Import data to spreadsheet/matrix window.
L File Import 	 Import data into the active spreadsheet
This item can be used to import data into LabPlot. Please read more in the import dialog section.
File Export 	Saves the active plot as special format.
Currently supported are Encapsulated Postscript (EPS), Portable Document Format (PDF), Scalable Vector Graphics (SVG) and Portable Network Graphics (PNG).
W File Close 	Closes the current opened LabPlot project file.
Q File Quit 	Quit LabPlot.

The Edit Menu
Edit Undo/Redo History 	Opens the LabPlot action history window. Select an item in the list to navigate to the corresponding step.

The Worksheet Menu
This menu contains all the items that can also be found in the context menu (right mouse) of a worksheet. The menu is only available when a worksheet object is selected on the Project Explorer panel.

The Spreadsheet Menu
This menu contains all the items that can also be found in the context menu (right mouse) of a spreadsheet. The menu is only available when a spreadsheet object is selected on the Project Explorer panel.

The CAS Worksheet Menu
This menu contains all the items that can also be found in the context menu (right mouse) of a CAS worksheet. The menu is only available when a worksheet object is selected on the Project Explorer panel.

The Datapicker Menu
This menu contains all the items that can also be found in the context menu (right mouse) of a datapicker. The menu is only available when a datapicker object is selected on the Project Explorer panel.

The Settings Menu
This menu gives you the ability to change user settings.
Apart from the common Settings menu entries described in the Settings Menu chapter of the Fundamentals LabPlot has this application specific menu entry:
F Settings Full Screen Mode 	Show the workspace in full screen mode.

The Help Menu
Additionally, LabPlot has the common Help menu items. For more information, read the section about the Help Menu of the Fundamentals.

Toolbar
The main toolbar contains the main items that you can find in the different menus. More details on this can be found in the Fundamentals manual.