LIBRARY "libics"
EXPORTS
    IcsAddHistoryString
    IcsClose
    IcsCloseIds
    IcsDeleteHistory
    IcsDeleteHistoryStringI
    IcsEnableWriteSensor
    IcsEnableWriteSensorStates
    IcsExtensionFind
    IcsFreeHistory
    IcsGetCoordinateSystem
    IcsGetData
    IcsGetDataBlock
    IcsGetDataSize
    IcsGetDataTypeProps
    IcsGetDataTypeSize
    IcsGetDataWithStrides
    IcsGetErrorText
    IcsGetHistoryKeyValue
    IcsGetHistoryKeyValueI
    IcsGetHistoryString
    IcsGetHistoryStringI
    IcsGetIcsName
    IcsGetIdsName
    IcsGetImageSize
    IcsGetImelSize
    IcsGetImelUnits
    IcsGetLayout
    IcsGetLibVersion
    IcsGetNumHistoryStrings
    IcsGetOrder
    IcsGetPosition
    IcsGetPreviewData
    IcsGetPropsDataType
    IcsGetROIData
    IcsGetScilType
    IcsGetSensorChannels
    IcsGetSensorDetectorBaseline
    IcsGetSensorDetectorLineAvgCnt
    IcsGetSensorDetectorPPU
    IcsGetSensorEmissionWavelength
    IcsGetSensorExcitationWavelength
    IcsGetSensorLensRI
    IcsGetSensorMediumRI
    IcsGetSensorModel
    IcsGetSensorNumAperture
    IcsGetSensorParameter
    IcsGetSensorParameterInt
    IcsGetSensorParameterString
    IcsGetSensorParameterVector
    IcsGetSensorPhotonCount
    IcsGetSensorPinholeRadius
    IcsGetSensorPinholeSpacing
    IcsGetSensorSTEDDepletionMode
    IcsGetSensorSTEDImmFraction
    IcsGetSensorSTEDLambda
    IcsGetSensorSTEDSatFactor
    IcsGetSensorSTEDVPPM
    IcsGetSensorType
    IcsGetSignificantBits
    IcsGuessScilType
    IcsInit
    IcsLoadPreview
    IcsNewHistoryIterator
    IcsOpen
    IcsOpenIds
    IcsReadIcs
    IcsReadIds
    IcsReadIdsBlock
    IcsReplaceHistoryStringI
    IcsSetCompression
    IcsSetCoordinateSystem
    IcsSetData
    IcsSetDataWithStrides
    IcsSetIdsBlock
    IcsSetImelUnits
    IcsSetLayout
    IcsSetOrder
    IcsSetPosition
    IcsSetScilType
    IcsSetSensorChannels
    IcsSetSensorDetectorBaseline
    IcsSetSensorDetectorLineAvgCnt
    IcsSetSensorDetectorPPU
    IcsSetSensorEmissionWavelength
    IcsSetSensorExcitationWavelength
    IcsSetSensorLensRI
    IcsSetSensorMediumRI
    IcsSetSensorModel
    IcsSetSensorNumAperture
    IcsSetSensorParameter
    IcsSetSensorParameterInt
    IcsSetSensorParameterString
    IcsSetSensorParameterVector
    IcsSetSensorPhotonCount
    IcsSetSensorPinholeRadius
    IcsSetSensorPinholeSpacing
    IcsSetSensorSTEDDepletionMode
    IcsSetSensorSTEDImmFraction
    IcsSetSensorSTEDLambda
    IcsSetSensorSTEDSatFactor
    IcsSetSensorSTEDVPPM
    IcsSetSensorType
    IcsSetSignificantBits
    IcsSetSource
    IcsSkipDataBlock
    IcsSkipIdsBlock
    IcsVersion
    IcsWriteIcs
    IcsWriteIds
    
