##############################################################################
#
#  List the test cases that are to be disabled temporarily.
#
#  Separate the test case name and the comment with ':'.
#
#    <testcasename> : MDEV-<xxxx> <comment>
#
#  Do not use any TAB characters for whitespace.
#
##############################################################################

galera_wan : MDEV-35940 Unallowed state transition: donor -> synced in galera_wan
galera_vote_rejoin_ddl : MDEV-35940 Unallowed state transition: donor -> synced in galera_wan
MW-329 : MDEV-35951 Complete freeze during MW-329 test
galera_vote_rejoin_dml : MDEV-35964 Assertion `ist_seqno >= cc_seqno' failed in galera_vote_rejoin_dml
galera_var_notify_cmd : MDEV-37257 WSREP: Notification command failed: 1 (Operation not permitted)
galera_var_notify_ssl_ipv6 : MDEV-37257 WSREP: Notification command failed: 1 (Operation not permitted)
