\hypertarget{structserver__info}{
\section{server\_\-info Struct Reference}
\label{structserver__info}\index{server\_\-info@{server\_\-info}}
}
\subsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\hypertarget{structserver__info_a16ffc17808e63ddd439abff0e700e7b0}{
\hyperlink{structSEXP}{SEXP\_\-t} $\ast$ {\bfseries protocol\_\-ent}}
\label{structserver__info_a16ffc17808e63ddd439abff0e700e7b0}

\item 
\hypertarget{structserver__info_a774b498eb39e740840894f90b5981f02}{
\hyperlink{structSEXP}{SEXP\_\-t} $\ast$ {\bfseries local\_\-address\_\-ent}}
\label{structserver__info_a774b498eb39e740840894f90b5981f02}

\item 
\hypertarget{structserver__info_a8fa60f5bbb5e17022203ec27bca3b7d2}{
\hyperlink{structSEXP}{SEXP\_\-t} $\ast$ {\bfseries local\_\-port\_\-ent}}
\label{structserver__info_a8fa60f5bbb5e17022203ec27bca3b7d2}

\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/pvrabec/project/openscap/openscap-\/0.5.12/src/OVAL/probes/unix/linux/inetlisteningservers.c\end{DoxyCompactItemize}
