\hypertarget{structxccdf__setvalue}{
\section{xccdf\_\-setvalue Struct Reference}
\label{structxccdf__setvalue}\index{xccdf\_\-setvalue@{xccdf\_\-setvalue}}
}


XCCDF set value option used in the profile.  


{\ttfamily \#include $<$xccdf.h$>$}\subsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\hypertarget{structxccdf__setvalue_aa8dba626b028921e9ece052324d12c8e}{
char $\ast$ {\bfseries item}}
\label{structxccdf__setvalue_aa8dba626b028921e9ece052324d12c8e}

\item 
\hypertarget{structxccdf__setvalue_af4b255af7cd845049802fd38305a45aa}{
char $\ast$ {\bfseries value}}
\label{structxccdf__setvalue_af4b255af7cd845049802fd38305a45aa}

\end{DoxyCompactItemize}


\subsection{Detailed Description}
XCCDF set value option used in the profile. 

The documentation for this struct was generated from the following file:\begin{DoxyCompactItemize}
\item 
/home/pvrabec/project/openscap/openscap-\/0.5.12/src/XCCDF/item.h\end{DoxyCompactItemize}
