The \library{libqt.a} library is a miscellaneous collection of useful
math and other routines.  The documentation previously found in this
manual of \library{libqt.a} functions has been removed and is now obsolete.
The current documentation of this library is generated automatically from
the {\tt doxygen} program and is available on the website at \\
\htmladdnormallink{
{\tt http://www.psicode.org/doc/libs/doxygen/html}}
{http://www.psicode.org/doc/libs/doxygen/html}.

