#This is the variable definition file of the tool module `...'.
#It is part of the software wims. Author: XIAO Gang

#Each non-comment line defines a variable. Format of the line:
#
#name	allow	log	default	llim	ulim
#
#name: name of the variable
#log: log priority. 0: no log. 1: little log. 2: more log. etc.
#allow: when allow the user to override the defined value.
#       it maybe any, deny, init, config, reply.
#llim, ulim: lower and upper limits. (Not valid for string variable)
#
#
#name	allow	log	llim	    ulim

any: job subjob user
init:MAXtechvar MAXcharname MAXnbvalue sheet_usedindivtechvar
reply:tc_value tc_name tc_set tc_abandon techvar techval[MAX_LTECHVAR] varfilter varfilterclear
deny: stechvar ol_name ol_value