\section{randomdb}
\label{module_randomdb}
This module contains the following objects

\begin{itemize}
\item \ref{object_RandomProteinDB} RandomProteinDB

\item \ref{object_RandomDNADB} RandomDNADB

\end{itemize}
\subsection{Object RandomProteinDB}

\label{object_RandomProteinDB}

The RandomProteinDB object has the following fields. To see how to access them refer to \ref{accessing_fields}
\begin{description}
\item{use_flat_length} Type [boolean : Scalar] No documentation

\item{length} Type [int : Scalar] No documentation

\item{length_dist} Type [Histogram * : Scalar] No documentation

\item{emission} Type [RandomModel * : Scalar] No documentation

\item{num} Type [int : Scalar] No documentation

\end{description}
No documentation for RandomProteinDB

Member functions of RandomProteinDB

\subsection{Object RandomDNADB}

\label{object_RandomDNADB}

The RandomDNADB object has the following fields. To see how to access them refer to \ref{accessing_fields}
\begin{description}
\item{use_flat_length} Type [boolean : Scalar] No documentation

\item{length} Type [int : Scalar] No documentation

\item{length_dist} Type [Histogram * : Scalar] No documentation

\item{emission} Type [RandomModelDNA * : Scalar] No documentation

\item{num} Type [int : Scalar] No documentation

\end{description}
No documentation for RandomDNADB

Member functions of RandomDNADB

