F (ω): FT of unsampled f(l)

Frequency (ω) −ω_m+ω_m 0 F_s(ω): FT of sampled f_s(l) = f(l)III_P −ω_m+ω_m 0 2π P 2π/P4π/P −2π/P −4π/P