# If two logons with the same SenderCompID/TargetCompID combination logon
# the second one must be disconnected

# First logon, succesful
i1,CONNECT
I1,8=FIX.4.235=A34=149=TW52=<TIME>56=ISLD98=0108=30
E1,8=FIX.4.29=6135=A34=149=ISLD52=00000000-00:00:00.00056=TW98=0108=3010=0

# Second logon, unsuccesful
i2,CONNECT
I2,8=FIX.4.235=A34=149=TW52=<TIME>56=ISLD98=0108=30

# wait for disconnect for second connection
e2,DISCONNECT
# force disconnect on first connection
i1,DISCONNECT