# SendingTime is too small, reject

iCONNECT
I8=FIX.4.435=A34=149=TW52=<TIME>56=ISLD98=0108=30
E8=FIX.4.49=6135=A34=149=ISLD52=00000000-00:00:00.00056=TW98=0108=3010=0
# send heartbeat more than 2 minutes early
I8=FIX.4.435=034=249=TW52=<TIME-121>56=ISLD
# reject and logoff
E8=FIX.4.49=9935=334=249=ISLD52=00000000-00:00:00.00056=TW45=258=SendingTime accuracy problem372=0373=1010=0
E8=FIX.4.49=4935=534=349=ISLD52=00000000-00:00:00.00056=TW10=0
I8=FIX.4.435=534=349=TW52=<TIME>56=ISLD
eDISCONNECT

# SendingTime is too large, reject

iCONNECT
I8=FIX.4.435=A34=149=TW52=<TIME>56=ISLD98=0108=30
E8=FIX.4.49=6135=A34=149=ISLD52=00000000-00:00:00.00056=TW98=0108=3010=0
# send heartbeat more than 2 minutes late
I8=FIX.4.435=034=249=TW52=<TIME+121>56=ISLD
# reject and logoff
E8=FIX.4.49=9935=334=249=ISLD52=00000000-00:00:00.00056=TW45=258=SendingTime accuracy problem372=0373=1010=0
E8=FIX.4.49=4935=534=349=ISLD52=00000000-00:00:00.00056=TW10=0
I8=FIX.4.435=534=349=TW52=<TIME>56=ISLD
eDISCONNECT