123456781.01.21.41.61.82.02.22.42.62.83.0Plot2dPiecewise linear

0101001010Plot2d1

Logarithmic scale(s)

123456781.01.21.41.61.82.02.22.42.62.83.0Plot2d2

Piecewise constant

123456781.01.21.41.61.82.02.22.42.62.83.0Plot2d3

Vertical bar plot