-210-11001010210-15-10-50510dbHz0123-1.5-1.0-0.50.00.51.01.50.001

0.91.11.51.82.43.95.5220.001

0.91.11.51.82.43.95.522Im(h(2i*pi*f))

Re(h(2i*pi*f))

Nyquist plot

-400-300-200-1000-15-10-50510h1h0.01

0.98

1.62.12.73.670.01

1.62.12.73.67magnitude phase h(2i.pi.f)

2.3db curve

-8-6-4-22-18-14-10-6-226-12-8-404812open loop zeroes open loop poles asymptotic directions

Imag. axis

Real axis

Evans root locus closed-loop poles loci