0.000

0.628

1.257

1.885

2.513

3.142

3.770

4.398

5.027

5.655

6.283

-2.0-1.6-1.2-0.8-0.40.00.40.81.21.62.0PLOTS OF SINUS sinus(x)

sinus(3x)

Values of x

max

-2.0-1.6-1.2-0.8-0.40.00.40.81.21.62.0